One of the Z’s: ECM = 500 GeV

0.5 1.0 1.5 2.0 2.5 3.0 θ [rad] 0.00

0.25

0.50

0.75

1.00 dσ dθ^[ fb rad^] f_4 = 0.0, f_5 = 0.0; σ_{tot} = (1.016 ± 0.005)fb

× f_4 = 0.01, f_5 = 0.0; σ_{tot} = (1.325 ± 0.005)fb ⋄ f_4 = 0.0, f_5 = 0.01; σ_{tot} = (1.226 ± 0.006)fb ⋆ f_4 = 0.01, f_5 = 0.01; σ_{tot} = (1.535 ± 0.006)fb

YFSZZ Jadach, Płaczek, Ward

×

× × × × × × × × ×× ×× ×× ××× ×××× ××××××××× ×××× × ×× × × ×× × × × × × ××

× ⋄

⋄ ⋄ ⋄ ⋄ ⋄ ⋄ ⋄ ⋄ ⋄⋄ ⋄ ⋄⋄ ⋄⋄ ⋄⋄⋄ ⋄⋄⋄ ⋄⋄⋄⋄⋄⋄⋄⋄⋄ ⋄⋄⋄ ⋄⋄ ⋄⋄ ⋄ ⋄ ⋄⋄ ⋄ ⋄ ⋄ ⋄ ⋄ ⋄⋄

⋄ ⋆

⋆ ⋆ ⋆ ⋆ ⋆ ⋆ ⋆ ⋆ ⋆⋆ ⋆ ⋆⋆ ⋆⋆ ⋆⋆⋆ ⋆⋆⋆ ⋆⋆⋆⋆⋆⋆⋆⋆⋆ ⋆⋆⋆⋆ ⋆ ⋆⋆ ⋆ ⋆ ⋆⋆ ⋆ ⋆ ⋆ ⋆ ⋆ ⋆⋆

⋆